
<template>
<div class="ssyx-ems-dashboard-editor-container">
<!--  6个方块-->
  <real-time-base-info/>
<!--  echart图表-->
  <el-row :gutter="32" style="background:#fff;margin:30px 0;">
    <el-col :xs="24" :sm="12" :lg="12">
      <cnglqx-chart/>
    </el-col>
    <el-col :xs="24" :sm="12" :lg="12">
      <pocpjwd-chart/>
    </el-col>
  </el-row>
  <el-row :gutter="32" style="margin:30px 0;">
    <el-col :xs="24" :sm="12" :lg="12">
      <dcpjsoc-chart/>
    </el-col>
    <el-col :xs="24" :sm="12" :lg="12">
      <dcpjwd-chart/>
    </el-col>
  </el-row>
</div>
</template>

<style scoped lang="scss">

</style>
<script>
import RealTimeBaseInfo from "./../RealTimeBaseInfo.vue";
import CnglqxChart from './CnglqxChart.vue'
import PocpjwdChart from './PocpjwdChart.vue'
import DcpjwdChart from './DcpjwdChart.vue'
import DcpjsocChart from './DcpjsocChart.vue'

export default {
  name:'ZdjkSbjkSsyx',
  components:{RealTimeBaseInfo,CnglqxChart,PocpjwdChart,DcpjwdChart,DcpjsocChart},
  data() {
    return {
    }
  },

}
</script>
