<template>
	<view class="page-container">
		<!-- 顶部6个数据 -->
		<uni-grid class="info-grid" :square="false" :column="2" :showBorder="false">
			<uni-grid-item v-for="(item,index) in runningHeadData" :key="index+'head'">
				<view class="grid-item-box">
					<image :src="require('@/static/images/ems/pcs/'+item.img+'.jpg')" class="icon" alt="">
						<view class="title">{{item.title}}</view>
						<view class="text">{{runningHeadInfo[item.attr] | formatNumber}}</view>
				</view>
			</uni-grid-item>
		</uni-grid>

		<uni-collapse ref="collapse" accordion v-if="list.length > 0">
			<uni-collapse-item v-for="(item,index) in list" :key="index+'pcs'" :open="index===0"
				class="common-collapse-item" :class="{
					'timing-collapse-item':!['0','2'].includes(item.workStatus),
					        'warning-collapse-item':item.workStatus === '2',
					        'running-collapse-item':item.workStatus === '0'
				}">

				<template v-slot:title>
					<view class='title-wrapper'>
						<view class="top">
							<view class="status">{{workStatusOptions[item.workStatus] || '暂无数据'}}</view>
							<text class="name">{{item.deviceName}}</text>
						</view>
					</view>
				</template>
				<view class='content'>
					<!-- 设备状态栏 -->
					<uni-group mode="card" class="status-card-group no-wrapper-padding">
						<view class="flex-container">
							<view class="flex-lists">
								<view class="grid-item-box">
									<view class="title">工作状态</view>
									<text
										class="text work-status-color">{{workStatusOptions[item.workStatus] || '-'}}</text>
								</view>
							</view>
							<view class="flex-lists">
								<view class="grid-item-box">
									<view class="title">并网状态</view>
									<text class="text">{{gridStatusOptions[item.gridStatus] || '-'}}</text>
								</view>
							</view>
							<view class="flex-lists">
								<view class="grid-item-box">
									<view class="title">设备状态</view>
									<text class="text">{{deviceStatusOptions[item.deviceStatus] || '-'}}</text>
								</view>
							</view>
							<view class="flex-lists">
								<view class="grid-item-box">
									<view class="title">控制模式</view>
									<text class="text">{{controlModeOptions[item.controlMode] || '-'}}</text>
								</view>
							</view>
						</view>
					</uni-group>
					<!-- 设备数据 -->
					<uni-group mode="card" class="data-card-group"
						:style="{marginBottom:!item.pcsBranchInfoList || item.pcsBranchInfoList.length === 0 ?'25px' : ''}">
						<uni-row v-for="(infoDataItem,infoDataIndex) in infoData" :key="infoDataIndex+'infoData'"
							class="data-row">
							<uni-col :span="8">
								<view class="title">{{infoDataItem.label}}</view>
							</uni-col>
							<uni-col :span="16">
								<view class="value">{{item[infoDataItem.attr] | formatNumber}}
									<text v-if="infoDataItem.unit" v-html="infoDataItem.unit"></text>
								</view>
							</uni-col>
						</uni-row>
					</uni-group>
					<!-- 支路 -->
					<uni-group class="branch-card-group" :title="`支路${pcsBranchIndex+1}`" mode="card"
						v-for="(pcsBranchItem,pcsBranchIndex) in item.pcsBranchInfoList"
						:key="pcsBranchIndex+'pcsBranchInfoList'">
						<view class="flex-container">
							<view class="flex-lists">
								<view class="grid-item-box">
									<view class="title">直流功率</view>
									<text class="text">{{pcsBranchItem.dcPower}}kW</text>
								</view>
							</view>
							<view class="flex-lists">
								<view class="grid-item-box">
									<view class="title">直流电压</view>
									<text class="text">{{pcsBranchItem.dcVoltage}}V</text>
								</view>
							</view>
							<view class="flex-lists">
								<view class="grid-item-box">
									<view class="title">直流电流</view>
									<text class="text">{{pcsBranchItem.dcCurrent}}A</text>
								</view>
							</view>
						</view>
					</uni-group>
				</view>
			</uni-collapse-item>
		</uni-collapse>
		<view class="no-data" v-else>
			暂无数据
		</view>
	</view>

</template>

<script>
	import {
		getRunningHeadInfo,
		getPcsDetailInfo
	} from '@/api/ems/site.js'
	import {
		mapState
	} from 'vuex'
	export default {
		computed: {
			...mapState({
				workStatusOptions: (state) =>
					state.ems.workStatusOptions,
				communicationStatusOptions: (state) =>
					state.ems.communicationStatusOptions,
				deviceStatusOptions: (state) =>
					state.ems.deviceStatusOptions,
				gridStatusOptions: (state) =>
					state.ems.gridStatusOptions,
				controlModeOptions: (state) =>
					state.ems.controlModeOptions,
			})
		},
		data() {
			return {
				runningHeadData: [{
					title: '实时有功功率（kW）',
					bgColor: '#FFF2CB',
					attr: 'totalActivePower',
					img: 'ssyggl'
				}, {
					title: '实时无功功率（kVar）',
					bgColor: '#CBD6FF',
					attr: 'totalReactivePower',
					img: 'sswggl'
				}, {
					title: '电池堆SOC',
					bgColor: '#DCCBFF',
					attr: 'soc',
					img: 'soc'
				}, {
					title: '电池堆SOH',
					bgColor: '#FFD4CB',
					attr: 'soh',
					img: 'soh'
				}, {
					title: '今日充电量（kWh）',
					bgColor: '#FFD6F8',
					attr: 'dayChargedCap',
					img: 'jrcdl'
				}, {
					title: '今日放电量（kWh）',
					bgColor: '#E1FFCA',
					attr: 'dayDisChargedCap',
					img: 'jrfdl'
				}],
				runningHeadInfo: {},
				list: [],
				siteId: '',
				infoData: [{
						label: "总交流有功功率",
						attr: "totalActivePower",
						unit: "kW",
						pointName: "总交流有功功率",
					},
					{
						label: "总交流无功功率",
						attr: "totalReactivePower",
						unit: "kVar",
						pointName: "总交流无功功率",
					},
					{
						label: "当天交流充电量",
						attr: "dailyAcChargeEnergy",
						unit: "kWh",
						pointName: "当天交流充电量 (kWh)",
					},
					{
						label: "当天交流放电量",
						attr: "dailyAcDischargeEnergy",
						unit: "kWh",
						pointName: "当天交流放电量 (kWh)",
					},
					{
						label: "A相电压",
						attr: "aPhaseVoltage",
						unit: "V",
						pointName: ""
					},
					{
						label: "A相电流",
						attr: "aPhaseCurrent",
						unit: "A",
						pointName: "A相电流",
					},

					{
						label: "B相电压",
						attr: "bPhaseVoltage",
						unit: "V",
						pointName: ""
					},
					{
						label: "B相电流",
						attr: "bPhaseCurrent",
						unit: "A",
						pointName: "B相电流",
					},
					{
						label: "总交流视在功率",
						attr: "totalApparentPower",
						unit: "kVA",
						pointName: "总交流视在功率",
					},
					{
						label: "总交流功率因数",
						attr: "totalPowerFactor",
						unit: "",
						pointName: "总交流功率因数",
					},
					{
						label: "PCS模块温度",
						attr: "pcsModuleTemperature",
						unit: "&#8451;",
						pointName: "",
					},
					{
						label: "PCS环境温度",
						attr: "pcsEnvironmentTemperature",
						unit: "&#8451;",
						pointName: "",
					},
					{
						label: "C相电压",
						attr: "cPhaseVoltage",
						unit: "V",
						pointName: ""
					},
					{
						label: "C相电流",
						attr: "cPhaseCurrent",
						unit: "A",
						pointName: "C相电流",
					},

					{
						label: "交流频率",
						attr: "acFrequency",
						unit: "Hz",
						pointName: "交流频率",
					},
				]
			}
		},
		onLoad(options) {
			uni.showLoading()
			this.siteId = options.siteId || ''
			getRunningHeadInfo({
				siteId: this.siteId
			}).then(response => {
				this.runningHeadInfo = response?.data || {}
			})

			getPcsDetailInfo({
				siteId: this.siteId
			}).then(response => {
				this.list = response?.data || []
				if (this.list.length > 0) {
					this.$nextTick(() => {
						setTimeout(() => {
							this.$refs.collapse.resize()
							uni.hideLoading()
						}, 100)
					})
				} else {
					uni.hideLoading()
				}
			}).catch(() => {
				uni.hideLoading()
			})
		}
	}
</script>
<style lang="scss" scoped>
	.info-grid {
		background: #fff;
		padding: 0 20rpx;

		.uni-grid-item {
			padding: 20rpx;

			.grid-item-box {
				box-shadow: 0 0 5px 1px rgba(0, 0, 0, 0.08);
				border-radius: 20rpx;

				.title {
					color: #333;
					margin-top: 10rpx;
				}

				.text {
					color: #000;
					white-space: nowrap;
					text-overflow: ellipsis;
					width: 100%;
					overflow-x: hidden;
					text-align: center;
				}
			}

		}

		.icon {
			height: 100rpx;
			width: 100rpx;
			display: block;
			border-radius: 20rpx;
		}
	}
</style>